CHAPTER VI

Harmonised standards and technical specifications of products and services

Presumption of conformity
Article 15
1
Products and services which are in conformity with harmonised standards or parts thereof the references of which have been published in the Official Journal of the European Union, shall be presumed to be in conformity with the accessibility requirements of this Directive in so far as those standards or parts thereof cover those requirements.
2
The Commission shall, in accordance with Article 10 of Regulation (EU) No 1025/2012, request one or more European standardisation organisations to draft harmonised standards for the product accessibility requirements set out in Annex I. The Commission shall submit the first such draft request to the relevant committee by 28 June 2021.
3
The Commission may adopt implementing acts establishing technical specifications that meet the accessibility requirements of this Directive where the following conditions have been fulfilled:
a
no reference to harmonised standards is published in the Official Journal of the European Union in accordance with Regulation (EU) No 1025/2012; and
b
either:
1. the Commission has requested one or more European standardisation organisations to draft a harmonised standard and there are undue delays in the standardisation procedure or the request has not been accepted by any European standardisation organisations; or
2. the Commission can demonstrate that a technical specification respects the requirements laid down in Annex II of Regulation (EU) No 1025/2012, except for the requirement that the technical specifications should have been developed by a non-profit making organisation.
Those implementing acts shall be adopted in accordance with the examination procedure referred to in Article 27(2).
4
Products and services which are in conformity with the technical specifications or parts thereof shall be presumed to be in conformity with the accessibility requirements of this Directive in so far as those technical specifications or parts thereof cover those requirements.