PART I

FRAMEWORK (GENERAL RULES FOR THE ORGANISATION OF THE SECTOR)
TITLE II

INSTITUTIONAL SET-UP AND GOVERNANCE
CHAPTER I

National regulatory and other competent authorities

Appointment and dismissal of members of national regulatory authorities
Article 7
1
The head of a national regulatory authority, or, where applicable, the members of the collegiate body fulfilling that function within a national regulatory authority or their alternates, shall be appointed for a term of office of at least three years from among persons of recognised standing and professional experience, on the basis of merit, skills, knowledge and experience and following an open and transparent selection procedure. Member States shall ensure continuity of decision-making.
2
Member States shall ensure that the head of a national regulatory authority, or where applicable, members of the collegiate body fulfilling that function within a national regulatory authority or their alternates may be dismissed during their term only if they no longer fulfil the conditions required for the performance of their duties which are laid down in national law before their appointment.
3
The decision to dismiss the head of the national regulatory authority concerned, or where applicable members of the collegiate body fulfilling that function, shall be made public at the time of dismissal. The dismissed head of the national regulatory authority or, where applicable, members of the collegiate body fulfilling that function shall receive a statement of reasons. In the event that the statement of reasons is not published, it shall be published upon that person’s request. Member States shall ensure that this decision is subject to review by a court, on points of fact as well as on points of law.