Reporting and review
Article 14
1
Each year by 30 June, Member States shall, on the basis of the results of the sampling, analysis and inspections carried out in accordance with Article 13, submit a report to the Commission on the compliance with the sulphur standards set out in this Directive for the preceding year.
On the basis of the reports received in accordance with the first subparagraph of this paragraph and the notifications regarding the non-availability of marine fuel which complies with this Directive submitted by Member States in accordance with the fifth subparagraph of Article 6(8), the Commission shall, within 12 months of the date referred to in the first subparagraph of this paragraph, draw up and publish a report on the implementation of this Directive. The Commission shall evaluate the need for further strengthening of the relevant provisions of this Directive and make any appropriate legislative proposals to that effect.
2
By 31 December 2013, the Commission shall submit a report to the European Parliament and to the Council which shall be accompanied, if appropriate, by legislative proposals. The Commission shall consider in its report the potential for reducing air pollution taking into account, inter alia: annual reports submitted in accordance with paragraphs 1 and 3; observed air quality and acidification; fuel costs; potential economic impact and observed modal shift; and progress in reducing emissions from ships.
3
The Commission may adopt implementing acts concerning the information to be included in the report and the format of the report referred to in paragraph 1. Those implementing acts shall be adopted in accordance with the examination procedure referred to in Article 17(2).