CHAPTER X

Final provisions

Repeal of Framework Decision 2008/977/JHA
Article 59
1
Framework Decision 2008/977/JHA is repealed with effect from 6 May 2018.
2
References to the repealed Decision referred to in paragraph 1 shall be construed as references to this Directive.