CHAPTER 4

FINAL PROVISIONS

Transitional provisions concerning the use of documents
Article 28
Documents falling within the scope of this Directive and issued by the competent authorities of the Member States under Directive 2006/87/EC before
6 October 2018
shall remain valid until they expire.
Substituted by Corrigendum to Directive (EU) 2016/1629 of the European Parliament and of the Council of 14 September 2016 laying down technical requirements for inland waterway vessels, amending Directive 2009/100/EC and repealing Directive 2006/87/EC (Official Journal of the European Union L 252 of 16 September 2016).