CHAPTER VII

FINAL PROVISIONS
Article 66
Directives 2005/60/EC and 2006/70/EC are repealed with effect from 26 June 2017.
References to the repealed Directives shall be construed as references to this Directive and shall be read in accordance with the correlation table set out in Annex IV.