TITLE II

PAYMENT SERVICE PROVIDERS
CHAPTER 1

Payment institutions
Section 1

General rules

Initial capital
Article 7
Member States shall require payment institutions to hold, at the time of authorisation, initial capital, comprised of one or more of the items referred to in Article 26(1)(a) to (e) of Regulation (EU) No 575/2013 as follows:
1. where the payment institution provides only the payment service as referred to in point (6) of Annex I, its capital shall at no time be less than EUR 20 000;
2. where the payment institution provides the payment service as referred to in point (7) of Annex I, its capital shall at no time be less than EUR 50 000;
3. where the payment institution provides any of the payment services as referred to in points (1) to (5) of Annex I, its capital shall at no time be less than EUR 125 000.