Article 1
In Appendix C to Annex II to Directive 2009/48/EC, the following entry shall be added:
Substance | CAS No | Limit value
‘Formamide | 75-12-7 | 20 μg/m3 (emission limit) after a maximum of 28 days from commencement of the emission testing of foam toy materials containing more than 200 mg/kg (cut-off limit based on content).’