TITLE II

AUTHORISATION AND OPERATING CONDITIONS FOR INVESTMENT FIRMS
CHAPTER I

Conditions and procedures for authorisation

Withdrawal of authorisations
Article 8
The competent authority may withdraw the authorisation issued to an investment firm where such an investment firm:
1. does not make use of the authorisation within 12 months, expressly renounces the authorisation or has provided no investment services or performed no investment activity for the preceding six months, unless the Member State concerned has provided for authorisation to lapse in such cases;
2. has obtained the authorisation by making false statements or by any other irregular means;
3. no longer meets the conditions under which authorisation was granted, such as compliance with the conditions set out in Regulation (EU) No 575/2013;
4. has seriously and systematically infringed the provisions adopted pursuant to this Directive or Regulation (EU) No 600/2014 governing the operating conditions for investment firms;
5. falls within any of the cases where national law, in respect of matters outside the scope of this Directive, provides for withdrawal.
Every withdrawal of authorisation shall be notified to ESMA.