TITLE II

PREPARATION
CHAPTER I

Recovery and resolution planning
Section 2

Recovery planning

Assessment of recovery plans
Article 6
1
Member States shall require institutions that are required to draw up recovery plans under Article 5(1) and Article 7(1) to submit those recovery plans to the competent authority for review. Member States shall require institutions to demonstrate to the satisfaction of the competent authority that those plans meet the criteria of paragraph 2.
2
The competent authorities shall, within six months of the submission of each plan, and after consulting the competent authorities of the Member States where significant branches are located insofar as is relevant to that branch, review it and assess the extent to which it satisfies the requirements laid down in Article 5 and the following criteria:
a
the implementation of the arrangements proposed in the plan is reasonably likely to maintain or restore the viability and financial position of the institution or of the group, taking into account the preparatory measures that the institution has taken or has planned to take;
b
the plan and specific options within the plan are reasonably likely to be implemented quickly and effectively in situations of financial stress and avoiding to the maximum extent possible any significant adverse effect on the financial system, including in scenarios which would lead other institutions to implement recovery plans within the same period.
3
When assessing the appropriateness of the recovery plans, the competent authority shall take into consideration the appropriateness of the institution’s capital and funding structure to the level of complexity of the organisational structure and the risk profile of the institution.
4
The competent authority shall provide the recovery plan to the resolution authority. The resolution authority may examine the recovery plan with a view to identifying any actions in the recovery plan which may adversely impact the resolvability of the institution and make recommendations to the competent authority with regard to those matters.
5
Where the competent authority assesses that there are material deficiencies in the recovery plan, or material impediments to its implementation, it shall notify the institution or the parent undertaking of the group of its assessment and require the institution to submit, within two months, extendable with the authorities’ approval by one month, a revised plan demonstrating how those deficiencies or impediments are addressed.
Before requiring an institution to resubmit a recovery plan the competent authority shall give the institution the opportunity to state its opinion on that requirement.
Where the competent authority does not consider the deficiencies and impediments to have been adequately addressed by the revised plan, it may direct the institution to make specific changes to the plan.
6
If the institution fails to submit a revised recovery plan, or if the competent authority determines that the revised recovery plan does not adequately remedy the deficiencies or potential impediments identified in its original assessment, and it is not possible to adequately remedy the deficiencies or impediments through a direction to make specific changes to the plan, the competent authority shall require the institution to identify within a reasonable timeframe changes it can make to its business in order to address the deficiencies in or impediments to the implementation of the recovery plan.
If the institution fails to identify such changes within the timeframe set by the competent authority, or if the competent authority assesses that the actions proposed by the institution would not adequately address the deficiencies or impediments, the competent authority may direct the institution to take any measures it considers to be necessary and proportionate, taking into account the seriousness of the deficiencies and impediments and the effect of the measures on the institution’s business.
The competent authority may, without prejudice to Article 104 of Directive 2013/36/EU, direct the institution to:
a
reduce the risk profile of the institution, including liquidity risk;
b
enable timely recapitalisation measures;
c
review the institution’s strategy and structure;
d
make changes to the funding strategy so as to improve the resilience of the core business lines and critical functions;
e
make changes to the governance structure of the institution.
The list of measures referred to in this paragraph does not preclude Member States from authorising competent authorities to take additional measures under national law.
7
When the competent authority requires an institution to take measures according to paragraph 6, its decision on the measures shall be reasoned and proportionate.
The decision shall be notified in writing to the institution and subject to a right of appeal.
8
EBA shall develop draft regulatory technical standards specifying the minimum criteria that the competent authority is to assess for the purposes of the assessment of paragraph 2 of this Article and of Article 8(1).
EBA shall submit those draft regulatory technical standards to the Commission by 3 July 2015.
Power is delegated to the Commission to adopt the regulatory technical standards referred to in the first subparagraph in accordance with Articles 10 to 14 of Regulation (EU) No 1093/2010.