CHAPTER VII

FINAL AND TRANSITIONAL PROVISIONS

Transitional provisions
Article 48
Member States shall not impede, for the aspects covered by this Directive, the making available on the market or putting into service of radio equipment covered by this Directive which is in conformity with the relevant Union harmonisation legislation applicable before 13 June 2016 and which was placed on the market before 13 June 2017.