CHAPTER III

CONFORMITY OF RADIO EQUIPMENT

General principles of the CE marking
Article 19
1
The CE marking shall be subject to the general principles set out in Article 30 of Regulation (EC) No 765/2008.
2
On account of the nature of radio equipment, the height of the CE marking affixed to radio equipment may be lower than 5 mm, provided that it remains visible and legible.