Amendments to Regulation (EU) No 1094/2010
Article 4
Regulation (EU) No 1094/2010 is amended as follows:
1. in Article 13, paragraph 1 is replaced by the following:
1.
The European Parliament or the Council may object to a regulatory technical standard within a period of three months from the date of notification of the regulatory technical standard adopted by the Commission. At the initiative of the European Parliament or of the Council that period shall be extended by three months.
Where the Commission adopts a regulatory technical standard which is the same as the draft regulatory technical standard submitted by the Authority, the period during which the European Parliament and the Council may object shall be one month from the date of notification. At the initiative of the European Parliament or the Council that period shall be extended by one month. That extended period may be further extended by one month at initiative of the European Parliament or the Council.
;
2. in Article 17(2), the second subparagraph is replaced by the following:
Without prejudice to the powers laid down in Article 35, the competent authority shall, without delay, provide the Authority with all information which the Authority considers necessary for its investigation, including with regard to how the acts referred to in Article 1(2) are applied in accordance with Union law.
.