Commission Delegated Directive 2014/5/EU
of 18 October 2013
amending, for the purposes of adapting to technical progress, Annex IV to Directive 2011/65/EU of the European Parliament and of the Council as regards an exemption for lead in solders on printed circuit boards, termination coatings of electrical and electronic components and coatings of printed circuit boards, solders for connecting wires and cables, solders connecting transducers and sensors that are used durably at a temperature below – 20 °C under normal operating and storage conditions
(Text with EEA relevance)

THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 2011/65/EU of the European Parliament and of the Council of 8 June 2011 on the restriction of the use of certain hazardous substances in electrical and electronic equipment, and in particular Article 5(1)(a) thereof,
OJ L 174, 1.7.2011, p. 88.
Whereas:
(1) Directive 2011/65/EU prohibits the use of lead in electrical and electronic equipment placed on the market.
(2) The substitution or elimination of lead in solders on printed circuit boards, termination coatings of electrical and electronic components and coatings of printed circuit boards, solders for connecting wires and cables, solders connecting transducers and sensors that are used durably at a temperature below – 20 °C under normal operating and storage conditions is currently not possible.
(3) Directive 2011/65/EU should therefore be amended accordingly,
HAS ADOPTED THIS DIRECTIVE: