Repeal
Article 21
Directive 94/19/EC as amended by the Directives listed in Annex II is repealed with effect from 4 July 2015 without prejudice to the obligations of the Member States relating to the time limits for transposition into national law and the dates of application of the Directives set out in Annex II.
References to the repealed Directives shall be construed as references to this Directive and shall be read in accordance with the correlation table in Annex III.
Substituted by Corrigendum to Directive 2014/49/EU of the European Parliament and of the Council of 16 April 2014 on deposit guarantee schemes (Official Journal of the European Union L 173 of 12 June 2014).