CHAPTER 1

GENERAL PROVISIONS

Supply of electricity
Article 5
In relation to electrical equipment, the Member States shall ensure that stricter safety requirements than the safety objectives referred to in Article 3 and set out in Annex I are not imposed by electricity supply bodies for connection to the grid, or for the supply of electricity to users of electrical equipment.