CHAPTER 3

CONFORMITY OF THE ELECTRICAL EQUIPMENT

Rules and conditions for affixing the CE marking
Article 17
1
The CE marking shall be affixed visibly, legibly and indelibly to the electrical equipment or to its data plate. Where that is not possible or not warranted on account of the nature of the electrical equipment, it shall be affixed to the packaging and to the accompanying documents.
2
The CE marking shall be affixed before the electrical equipment is placed on the market.
3
Member States shall build upon existing mechanisms to ensure correct application of the regime governing the CE marking and shall take appropriate action in the event of improper use of that marking.