CHAPTER 3

CONFORMITY OF THE ELECTRICAL EQUIPMENT

Presumption of conformity on the basis of national standards
Article 14
Where harmonised standards referred to in Article 12 have not been drawn up and published and international standards referred to in Article 13 have not been published, the Member States shall take all appropriate measures to ensure that, for the purpose of making available on the market or free movement as referred to in Articles 3 and 4 respectively, their competent authorities shall also regard as complying with the safety objectives referred to in Article 3 and set out in Annex I electrical equipment manufactured in accordance with the safety provisions of the standards in force in the Member State of manufacture, if it ensures a safety level equivalent to that required in their own territory.