CHAPTER 3

CONFORMITY OF THE ELECTRICAL EQUIPMENT

Presumption of conformity on the basis of harmonised standards
Article 12
Electrical equipment which is in conformity with harmonised standards or parts thereof the references of which have been published in the Official Journal of the European Union shall be presumed to be in conformity with the safety objectives referred to in Article 3 and set out in Annex I covered by those standards or parts thereof.