CHAPTER 7

TRANSITIONAL AND FINAL PROVISIONS

Transitional provisions
Article 50
1
Member States shall not impede the making available on the market and/or the putting into use of measuring instruments covered by Directive 2004/22/EC which are in conformity with that Directive and which were placed on the market before 20 April 2016.
Certificates issued under Directive 2004/22/EC shall be valid under this Directive.
2
The effects of Article 23 of Directive 2004/22/EC shall continue until 30 October 2016.