CHAPTER 1

GENERAL PROVISIONS

Applicability to sub-assemblies
Article 5
Where instrument-specific annexes lay down the essential requirements for sub-assemblies, this Directive shall apply mutatis mutandis to such sub-assemblies.
Sub-assemblies and measuring instruments may be assessed independently and separately for the purpose of establishing conformity.