CHAPTER 3

CONFORMITY OF MEASURING INSTRUMENTS

General principles of the CE marking and of the supplementary metrology marking
Article 21
1
The CE marking shall be subject to the general principles set out in Article 30 of Regulation (EC) No 765/2008.
2
The supplementary metrology marking shall consist of the capital letter ‘M’ and the last two digits of the year of its affixing, surrounded by a rectangle. The height of the rectangle shall be equal to the height of the CE marking.
3
The general principles set out in Article 30 of Regulation (EC) No 765/2008 shall apply, mutatis mutandis, to the supplementary metrology marking.