CHAPTER 6

COMMITTEE, TRANSITIONAL AND FINAL PROVISIONS

Transitional provisions
Article 43
Member States shall not impede the making available on the market and/or the putting into service of equipment covered by Directive 2004/108/EC which is in conformity with that Directive and which was placed on the market before 20 April 2016.