CHAPTER 1

GENERAL PROVISIONS

Making available on the market and/or putting into service
Article 4
Member States shall take all appropriate measures to ensure that equipment is made available on the market and/or put into service only if it complies with this Directive when properly installed, maintained and used for its intended purpose.