CHAPTER 1

GENERAL PROVISIONS

Making available on the market and putting into service
Article 3
1
Member States shall take all necessary steps to ensure that the vessels may be made available on the market and put into service only if they satisfy the requirements of this Directive when properly installed and maintained and used for the purposes for which they are intended.
2
The provisions of this Directive shall not affect the right of Member States to specify the requirements they deem necessary in order to ensure that workers are protected when using vessels, provided it does not mean that those vessels are modified in a way unspecified in this Directive.