CHAPTER 1

GENERAL PROVISIONS

Definitions
Article 2
For the purposes of this Directive, the following definitions shall apply:
1. ‘making available on the market’ means any supply of a vessel for distribution or use on the Union market in the course of a commercial activity, whether in return for payment or free of charge;
2. ‘placing on the market’ means the first making available of a vessel on the Union market;
3. ‘manufacturer’ means any natural or legal person who manufactures a vessel or has a vessel designed or manufactured, and markets that vessel under his name or trade mark;
4. ‘authorised representative’ means any natural or legal person established within the Union who has received a written mandate from a manufacturer to act on his behalf in relation to specified tasks;
5. ‘importer’ means any natural or legal person established within the Union who places a vessel from a third country on the Union market;
6. ‘distributor’ means any natural or legal person in the supply chain, other than the manufacturer or the importer, who makes a vessel available on the market;
7. ‘economic operators’ means the manufacturer, the authorised representative, the importer and the distributor;
8. ‘technical specification’ means a document that prescribes technical requirements to be fulfilled by a vessel;
9. ‘harmonised standard’ means harmonised standard as defined in point (c) of point 1 of Article 2 of Regulation (EU) No 1025/2012;
10. ‘accreditation’ means accreditation as defined in point 10 of Article 2 of Regulation (EC) No 765/2008;
11. ‘national accreditation body’ means national accreditation body as defined in point 11 of Article 2 of Regulation (EC) No 765/2008;
12. ‘conformity assessment’ means the process demonstrating whether the essential safety requirements of this Directive relating to a vessel have been fulfilled;
13. ‘conformity assessment body’ means a body that performs conformity assessment activities including calibration, testing, certification and inspection;
14. ‘recall’ means any measure aimed at achieving the return of a vessel that has already been made available to the end-user;
15. ‘withdrawal’ means any measure aimed at preventing a vessel in the supply chain from being made available on the market;
16. ‘Union harmonisation legislation’ means any Union legislation harmonising the conditions for the marketing of products;
17. ‘CE marking’ means a marking by which the manufacturer indicates that the vessel is in conformity with the applicable requirements set out in Union harmonisation legislation providing for its affixing.