CHAPTER 3

CONFORMITY OF VESSELS OF WHICH THE PRODUCT OF PS × V EXCEEDS 50 bar.L

General principles of the CE marking
Article 15
The CE marking shall be subject to the general principles set out in Article 30 of Regulation (EC) No 765/2008.