TITLE II

RULES ON PUBLIC CONTRACTS
CHAPTER III

Conduct of the procedure
Section 1

Preparation

Setting time limits
Article 47
1
When fixing the time limits for the receipt of tenders and requests to participate, contracting authorities shall take account of the complexity of the contract and the time required for drawing up tenders, without prejudice to the minimum time limits set out in Articles 27 to 31.
2
Where tenders can be made only after a visit to the site or after on-the-spot inspection of the documents supporting the procurement documents, the time limits for the receipt of tenders, which shall be longer than the minimum time limits set out in Articles 27 to 31, shall be fixed so that all economic operators concerned may be aware of all the information needed to produce tenders.
3
Contracting authorities shall extend the time limits for the receipt of tenders so that all economic operators concerned may be aware of all the information needed to produce tenders in the following cases:
a
where, for whatever reason, additional information, although requested by the economic operator in good time, is not supplied at the latest six days before the time limit fixed for the receipt of tenders. In the event of an accelerated procedure as referred to in Article 27(3) and Article 28(6), that period shall be four days;
b
where significant changes are made to the procurement documents.
The length of the extension shall be proportionate to the importance of the information or change.
Where the additional information has either not been requested in good time or its importance with a view to preparing responsive tenders is insignificant, contracting authorities shall not be required to extend the time limits.