CHAPTER 14

FINAL PROVISIONS

Amendment of Regulation (EU) No 1093/2010
Article 48
Regulation (EU) No 1093/2010 is amended as follows:
1. The second subparagraph of Article 13(1) is replaced by the following:
Where the Commission adopts a regulatory technical standard which is the same as the draft regulatory technical standard submitted by the Authority, the period during which the European Parliament and the Council may object shall be 1 month from the date of notification. At the initiative of the European Parliament or the Council that period shall be extended for an initial period of 1 month and shall be extendable for a further period of 1 month.
2. The second subparagraph of Article 17(2) is replaced by the following:
Without prejudice to the powers laid down in Article 35, the competent authority shall, without delay, provide the Authority with all information which the Authority considers necessary for its investigation including as to how the acts referred to in Article 1(2) are applied in accordance with Union law.