Commission Delegated Directive 2014/14/EU
of 18 October 2013
amending, for the purposes of adapting to technical progress, the Annex III to Directive 2011/65/EU of the European Parliament and of the Council as regards an exemption for 3,5 mg mercury per lamp in single capped compact fluorescent lamps for general lighting purposes < 30 W with a lifetime equal to or above 20 000 h
(Text with EEA relevance)

THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 2011/65/EU of the European Parliament and of the Council of 8 June 2011 on the restriction of the use of certain hazardous substances in electrical and electronic equipment, and in particular Article 5(1)(a) thereof,
OJ L 174, 1.7.2011, p. 88.
Whereas:
(1) Directive 2011/65/EU prohibits the use of mercury in electrical and electronic equipment placed on the market.
(2) Single capped compact fluorescent lamps for general lighting purposes < 30 W with a lifetime equal to or above 20 000 h need 3,5 mg mercury to avoid light output failures during the life of the product. Suitable substitutes do not exist at this time.
(3) Directive 2011/65/EU should therefore be amended accordingly,
HAS ADOPTED THIS DIRECTIVE: