CHAPTER IX

GENERAL RESPONSIBILITIES OF MEMBER STATES AND COMPETENT AUTHORITIES AND OTHER REQUIREMENTS FOR REGULATORY CONTROL
SECTION 4

Significant events

Notification and recording of significant events
Article 96
Member States shall require the undertaking to:
1. implement, as appropriate, a recording and analysis system of significant events involving or potentially involving accidental or unintended exposures;
2. promptly notify the competent authority of the occurrence of any significant event resulting or liable to result in the exposure of an individual beyond the operational limits or conditions of operation specified in authorising requirements with regard to occupational or public exposure or as defined by the competent authority for medical exposure, including the results of the investigation and the corrective measures to avoid such events.