CHAPTER VI

GENERAL AND FINAL PROVISIONS

Entry into force and application
Article 54
This Directive shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
Articles 47 and 48 shall apply from 21 July 2015.