CHAPTER VI

GENERAL AND FINAL PROVISIONS

Repeal
Article 53
Directive 2005/85/EC is repealed for the Member States bound by this Directive with effect from 21 July 2015, without prejudice to the obligations of the Member States relating to the time limit for transposition into national law of the Directive set out in Annex II, Part B.
References to the repealed Directive shall be construed as references to this Directive and shall be read in accordance with the correlation table in Annex III.