CHAPTER 3

CONFORMITY OF THE PYROTECHNIC ARTICLE

Presumption of conformity of pyrotechnic articles
Article 16
Pyrotechnic articles which are in conformity with harmonised standards or parts thereof the references of which have been published in the Official Journal of the European Union shall be presumed to be in conformity with the essential safety requirements set out in Annex I covered by those standards or parts thereof.