Article 1
Annex III to Directive 2011/65/EU is amended as set out...
Article 2
(1) Member States shall bring into force the laws, regulations...
Article 3
This Directive shall enter into force on the twentieth day...
Article 4
This Directive is addressed to the Member States.
ANNEX
In Annex III to Directive 2011/65/EU the following point 7(c)-IV...
7(c)-IV Lead in PZT based dielectric ceramic materials for capacitors...
Commission Delegated Directive 2012/50/EU
of 10 October 2012
amending, for the purposes of adapting to technical progress, Annex III to Directive 2011/65/EU of the European Parliament and of the Council as regards an exemption for applications containing lead
(Text with EEA relevance)
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 2011/65/EU of the European Parliament and of the Council of 8 June 2011 on the restriction of the use of certain hazardous substances in electrical and electronic equipment , and in particular Article 5(1)(a) thereof,
Whereas:
(1)
Directive 2011/65/EU prohibits the use of lead in electrical and electronic equipment placed on the market.
(2)
The substitution of lead in PZT based dielectric ceramic materials for capacitors which are part of integrated circuits or discrete semiconductors is still technically impracticable. The use of lead in those materials should therefore be exempted from the prohibition.
(3)
Directive 2011/65/EU should therefore be amended accordingly,
HAS ADOPTED THIS DIRECTIVE:
OJ L 174, 1.7.2011, p. 88.