Article 2
Equipment listed in column 1 of Annex A.1 as ‘new item’ or as having been transferred from Annex A.2 which was manufactured before 30 November 2013 in conformity with procedures for type-approval already in force before that date within the territory of a Member State may continue to be placed on the market and on board a Community ship until 30 November 2015.