Article 1
Annex I to Directive 98/8/EC is amended in accordance with...
Article 2
(1) Member States shall adopt and publish, by 31 January...
Article 3
This Directive shall enter into force on the 20th day...
Article 4
This Directive is addressed to the Member States.
ANNEX
In Annex I to Directive 98/8/EC, the following entries are...
For the implementation of the common principles of Annex VI,...
Commission Directive 2012/2/EU
of 9 February 2012
amending Directive 98/8/EC of the European Parliament and of the Council to include copper (II) oxide, copper (II) hydroxide and basic copper carbonate as active substances in Annex I thereto
(Text with EEA relevance) (repealed)
THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Directive 98/8/EC of the European Parliament and of the Council of 16 February 1998 concerning the placing of biocidal products on the market , and in particular the second subparagraph of Article 16(2) thereof,
Whereas:
(1)
Commission Regulation (EC) No 1451/2007 of 4 December 2007 on the second phase of the 10-year work programme referred to in Article 16(2) of Directive 98/8/EC of the European Parliament and of the Council concerning the placing of biocidal products on the market establishes a list of active substances to be assessed, with a view to their possible inclusion in Annex I, IA or IB to Directive 98/8/EC. That list includes copper (II) oxide, copper (II) hydroxide and basic copper carbonate for use in product type 8, wood preservatives, as defined in Annex V to that Directive.
(2)
Pursuant to Regulation (EC) No 1451/2007, copper (II) oxide, copper (II) hydroxide and basic copper carbonate have been evaluated in accordance with Article 11(2) of Directive 98/8/EC for use in product type 8.
(3)
France was designated as rapporteur Member State and submitted the competent authority reports, together with recommendations, to the Commission in accordance with Article 14(4) and (6) of Regulation (EC) No 1451/2007 on 10 May 2007 for copper (II) oxide, on 19 February 2008 for copper (II) hydroxide, and on 10 May 2007 and 19 February 2008 for basic copper carbonate.
(4)
The competent authority reports were reviewed by the Member States and the Commission. In accordance with Article 15(4) of Regulation (EC) No 1451/2007, the findings of the reviews were incorporated, within the Standing Committee on Biocidal Products on 22 September 2011, in an assessment report.
(5)
It appears from the evaluations that biocidal products used as wood preservatives and containing copper (II) oxide, copper (II) hydroxide or basic copper carbonate may be expected to satisfy the requirements laid down in Article 5 of Directive 98/8/EC. It is therefore appropriate to include copper (II) oxide, copper (II) hydroxide and basic copper carbonate in Annex I to that Directive.
(6)
Not all potential uses have been evaluated at Union level. It is therefore appropriate to require that Member States assess those uses or exposure scenarios and those risks to human populations and to environmental compartments that have not been representatively addressed in the Union level risk assessment and, when granting product authorisations, ensure that appropriate measures are taken or specific conditions imposed in order to reduce the identified risks to acceptable levels.
(7)
In view of the risks identified for human health, it is appropriate to require that safe operational procedures are established for products containing copper (II) oxide, copper (II) hydroxide or basic copper carbonate and authorised for industrial use, and that those products are used with appropriate personal protective equipment, unless it can be demonstrated in the application for product authorisation that risks to industrial users can be reduced to an acceptable level by other means.
(8)
Copper (II) hydroxide and basic copper carbonate were also evaluated for application by dipping, and should, in view of the risks identified for human health, not be authorised for that use, unless data is submitted to demonstrate that the product will meet the requirements of Article 5 and Annex VI, if necessary by the application of appropriate mitigation measures. For copper (II) oxide, application by dipping was not assessed, and it follows from the requirement referred to in recital 6 that products cannot be authorised for such application unless the authorising Member State assesses it.
(9)
Unacceptable risks for the environment were identified in the case of wood treated with copper (II) oxide, copper (II) hydroxide or basic copper carbonate and used for outdoor constructions near or above water (the ‘bridge’ scenario in use class 3, as defined by OECD ). For basic copper carbonate and copper (II) oxide, unacceptable risks were also found for in-service use of treated wood in contact with fresh water (use class 4b as defined by OECD). It is therefore appropriate to require that products are not authorised for the treatment of wood intended for those uses, unless data is submitted demonstrating that the product will meet the requirements of both Article 5 of and Annex VI to Directive 98/8/EC, if necessary by the application of appropriate risk mitigation measures. For copper (II) hydroxide, wood in contact with fresh water was not assessed, and it follows from the requirement referred to in recital 6 above that products cannot be authorised for that use unless the authorising Member State assesses it.
(10)
In view of the risks identified for the aquatic and soil compartments, it is appropriate to require that freshly treated timber is stored after treatment under shelter or on impermeable hard standing, or both, and that any losses from the application of products used as wood preservatives and containing copper (II) oxide, copper (II) hydroxide or basic copper carbonate are collected for reuse or disposal.
(11)
The provisions of this Directive should be applied at the same time in all Member States in order to ensure equal treatment on the Union market of biocidal products containing the active substances copper (II) oxide, copper (II) hydroxide and basic copper carbonate, and also to facilitate the proper operation of the biocidal products market in general.
(12)
A reasonable period should be allowed to elapse before an active substance is included in Annex I to Directive 98/8/EC in order to permit Member States and interested parties to prepare themselves to meet the new requirements entailed and to ensure that applicants who have prepared dossiers can benefit fully from the 10-year period of data protection, which, in accordance with Article 12(1)(c)(ii) of Directive 98/8/EC, starts from the date of inclusion.
(13)
After inclusion, Member States should be allowed a reasonable period to implement Article 16(3) of Directive 98/8/EC.
(14)
Directive 98/8/EC should therefore be amended accordingly.
(15)
The measures provided for in this Directive are in accordance with the opinion of the Standing Committee on Biocidal Products,
HAS ADOPTED THIS DIRECTIVE:
OJ L 123, 24.4.1998, p. 1.
OJ L 325, 11.12.2007, p. 3.
OECD series on emission scenario documents, Number 2, Emission Scenario Document for Wood Preservatives, part 2, p. 64.