Information for treatment facilities
Article 15
1
In order to facilitate the preparation for re-use and the correct and environmentally sound treatment of WEEE, including maintenance, upgrade, refurbishment and recycling, Member States shall take the necessary measures to ensure that producers provide information free of charge about preparation for re-use and treatment in respect of each type of new EEE placed for the first time on the Union market within one year after the equipment is placed on the market. This information shall identify, as far as it is needed by centres which prepare for re-use and treatment and recycling facilities in order to comply with the provisions of this Directive, the different EEE components and materials, as well as the location of dangerous substances and mixtures in EEE. It shall be made available to centres which prepare for re-use and treatment and recycling facilities by producers of EEE in the form of manuals or by means of electronic media (e.g. CD-ROM, online services).
2
In order to enable the date upon which the EEE was placed on the market to be determined unequivocally, Member States shall ensure that a mark on the EEE specifies that the latter was placed on the market after 13 August 2005. Preferably, the European Standard EN 50419 shall be applied for this purpose.