ANNEX V

MINIMUM RECOVERY TARGETS REFERRED TO IN ARTICLE 11
Part 1:

Minimum targets applicable by category from 13 August 2012 until 14 August 2015 with reference to the categories listed in Annex I:
1. for WEEE falling within category 1 or 10 of Annex I,
  - 80 % shall be recovered, and
  - 75 % shall be recycled;
2. for WEEE falling within category 3 or 4 of Annex I,
  - 75 % shall be recovered, and
  - 65 % shall be recycled;
3. for WEEE falling within category 2, 5, 6, 7, 8 or 9 of Annex I,
  - 70 % shall be recovered, and
  - 50 % shall be recycled;
4. for gas discharge lamps, 80 % shall be recycled.
Part 2:

Minimum targets applicable by category from 15 August 2015 until 14 August 2018 with reference to the categories listed in Annex I:
1. for WEEE falling within category 1 or 10 of Annex I,
  - 85 % shall be recovered, and
  - 80 % shall be prepared for re-use and recycled;
2. for WEEE falling within category 3 or 4 of Annex I,
  - 80 % shall be recovered, and
  - 70 % shall be prepared for re-use and recycled;
3. for WEEE falling within category 2, 5, 6, 7, 8 or 9 of Annex I,
  - 75 % shall be recovered, and
  - 55 % shall be prepared for re-use and recycled;
4. for gas discharge lamps, 80 % shall be recycled.
Part 3:

Minimum targets applicable by category from 15 August 2018 with reference to the categories listed in Annex III:
1. for WEEE falling within category 1 or 4 of Annex III,
  - 85 % shall be recovered, and
  - 80 % shall be prepared for re-use and recycled;
2. for WEEE falling within category 2 of Annex III,
  - 80 % shall be recovered, and
  - 70 % shall be prepared for re-use and recycled;
3. for WEEE falling within category 5 or 6 of Annex III,
  - 75 % shall be recovered, and
  - 55 % shall be prepared for re-use and recycled;
4. for WEEE falling within category 3 of Annex III, 80 % shall be recycled.