Prohibition of use
Article 19
1
Member States shall prohibit the use or bringing into use of any establishment, installation or storage facility, or any part thereof where the measures taken by the operator for the prevention and mitigation of major accidents are seriously deficient. To this end, Member States shall, inter alia, take into account serious failures to take the necessary actions identified in the inspection report.
Member States may prohibit the use or bringing into use of any establishment, installation or storage facility, or any part thereof if the operator has not submitted the notification, reports or other information required by this Directive within the specified period.
2
Member States shall ensure that operators may appeal against a prohibition order by a competent authority under paragraph 1 to an appropriate body determined by national law and procedures.