Report and regular dialogue
Article 4
1
The Commission shall, not later than five years after the final date for application of the provisions referred to in Article 5(2), publish a report concerning the functioning of the system of interconnection of registers, in particular examining its technical operation and its financial aspects.
2
That report shall be accompanied, if appropriate, by proposals for amending this Directive.
3
The Commission and the representatives of the Member States shall regularly convene to discuss the matters covered by this Directive in any appropriate forum.