CHAPTER I GENERAL PROVISIONS

Article 1 Purpose
The purpose of this Directive is to lay down standards for the qualification of third-country nationals or stateless persons as beneficiaries of international protection, for a uniform status for refugees or for persons eligible for subsidiary protection, and for the content of the protection-granted.