ANNEX II
In Annex I to Directive 2002/87/EC, under ‘II. Technical Calculation Methods’, Method 3 and Method 4 are replaced by the following:
Method 3
- “Combination method”
Competent authorities may allow a combination of method 1 and method 2.
.