CHAPTER 2

OBLIGATIONS

Licence holders
Article 7
1
Member States shall ensure that the prime responsibility for the safety of spent fuel and radioactive waste management facilities and/or activities rest with the licence holder. That responsibility can not be delegated.
2
Member States shall ensure that the national framework in place require licence holders, under the regulatory control of the competent regulatory authority, to regularly assess, verify and continuously improve, as far as is reasonably achievable, the safety of the radioactive waste and spent fuel management facility or activity in a systematic and verifiable manner. This shall be achieved through an appropriate safety assessment, other arguments and evidence.
3
As part of the licensing of a facility or activity the safety demonstration shall cover the development and operation of an activity and the development, operation and decommissioning of a facility or closure of a disposal facility as well as the post-closure phase of a disposal facility. The extent of the safety demonstration shall be commensurate with the complexity of the operation and the magnitude of the hazards associated with the radioactive waste and spent fuel, and the facility or activity. The licensing process shall contribute to safety in the facility or activity during normal operating conditions, anticipated operational occurrences and design basis accidents. It shall provide the required assurance of safety in the facility or activity. Measures shall be in place to prevent accidents and mitigate the consequences of accidents, including verification of physical barriers and the licence holder’s administrative protection procedures that would have to fail before workers and the general public would be significantly affected by ionising radiation. That approach shall identify and reduce uncertainties.
4
Member States shall ensure that the national framework require licence holders to establish and implement integrated management systems, including quality assurance, which give due priority for overall management of spent fuel and radioactive waste to safety and are regularly verified by the competent regulatory authority.
5
Member States shall ensure that the national framework require licence holders to provide for and maintain adequate financial and human resources to fulfil their obligations with respect to the safety of spent fuel and radioactive waste management as laid down in paragraphs 1 to 4.