Obligations of importers
Article 9
Member States shall ensure that:
1. importers place only EEE that complies with this Directive on the Union market;
2. importers, before placing an EEE on the market, ensure that the appropriate conformity assessment procedure has been carried out by the manufacturer, and that they further ensure that the manufacturer has drawn up the technical documentation, that the EEE bears the CE marking and is accompanied by the required documents, and that the manufacturer has complied with the requirements set out in points (f) and (g) of Article 7;
3. where an importer considers or has reason to believe that an EEE is not in conformity with Article 4, that importer does not place the EEE on the market until it has been brought into conformity, and that that importer informs the manufacturer and the market surveillance authorities to that effect;
4. importers indicate their name, registered trade name or registered trade mark and the address at which they can be contacted on the EEE or, where that is not possible, on its packaging or in a document accompanying the EEE. Where other applicable Union legislation contains provisions for the affixing of the importer’s name and address which are at least as stringent, those provisions shall apply;
5. importers, in order to ensure compliance with this Directive, keep a register of non-compliant EEE and EEE recalls, and keep distributors informed thereof;
6. importers who consider or have reason to believe that an EEE which they have placed on the market is not in conformity with this Directive immediately take the corrective measures necessary to bring that EEE into conformity, to withdraw it or recall it, as appropriate, and immediately inform the competent national authorities of the Member States in which they made the EEE available to that effect, giving details, in particular, of the non-compliance and of any corrective measures taken;
7. importers keep, for 10 years following the placing on the market of the EEE, a copy of the EU declaration of conformity at the disposal of the market surveillance authorities and ensure that the technical documentation can be made available to those authorities, upon request;
8. importers, further to a reasoned request from a competent national authority, provide it with all the information and documentation necessary to demonstrate the conformity of an EEE with this Directive in a language which can be easily understood by that authority, and that they cooperate with that authority, at its request, on any action taken to ensure compliance with this Directive of EEE which they have placed on the market.