Formal objection to a harmonised standard
Article 17
1
Where a Member State or the Commission considers that a harmonised standard does not entirely satisfy the requirements which it covers and which are set out in Article 4, the Commission or the Member State concerned shall bring the matter before the Committee set up pursuant to Article 5 of Directive 98/34/EC, giving its arguments. The Committee shall, after consulting the relevant European standardisation bodies, deliver its opinion without delay.
2
In the light of the Committee’s opinion, the Commission shall decide to publish, not to publish, to publish with restriction, to maintain, to maintain with restriction or to withdraw the references to the harmonised standard concerned in or from the Official Journal of the European Union.
3
The Commission shall inform the European standardisation body concerned and, if necessary, request the revision of the harmonised standards concerned.