Article 1
Directive 98/70/EC is amended as follows:
1. Annex I is amended as follows:
  1. footnote 1 is replaced by the following:
(1)
Test methods shall be those specified in EN 228:2008. Member States may adopt the analytical method specified in replacement EN 228:2008 standard if it can be shown to give at least the same accuracy and at least the same level of precision as the analytical method it replaces.
;
  2. footnote 6 is replaced by the following:
(6)
Other mono-alcohols and ethers with a final boiling point no higher than that stated in EN 228:2008.
;
2. in Annex II, footnote 1 is replaced by the following:
(1)
Test methods shall be those specified in EN 590:2009. Member States may adopt the analytical method specified in replacement EN 590:2009 standard if it can be shown to give at least the same accuracy and at least the same level of precision as the analytical method it replaces.
;
3. Annex III is replaced by the text set out in the Annex to this Directive.