CHAPTER VII

GENERAL AND FINAL PROVISIONS

Repeal of Directive 77/799/EEC
Article 28
Directive 77/799/EEC is repealed with effect from 1 January 2013.
References made to the repealed Directive shall be construed as references to this Directive.