CHAPTER X

FINAL PROVISIONS

Safeguard measures
Article 46
1
In the event of a sudden crisis in the energy market or where the physical safety or security of persons, apparatus or installations or system integrity is threatened, a Member State may temporarily take the necessary safeguard measures.
2
Such measures shall cause the least possible disturbance to the functioning of the internal market and shall be no wider in scope than is strictly necessary to remedy the sudden difficulties which have arisen.
3
The Member State concerned shall, without delay, notify those measures to the other Member States, and to the Commission, which may decide that the Member State concerned must amend or abolish such measures, insofar as they distort competition and adversely affect trade in a manner which is at variance with the common interest.