CHAPTER VII

ORGANISATION OF ACCESS TO THE SYSTEM

Refusal of access
Article 35
1
Natural gas undertakings may refuse access to the system on the basis of lack of capacity or where the access to the system would prevent them from carrying out the public service obligations referred to in Article 3(2) which are assigned to them or on the basis of serious economic and financial difficulties with take-or-pay contracts having regard to the criteria and procedures set out in Article 48 and the alternative chosen by the Member State in accordance with paragraph 1 of that Article. Duly substantiated reasons shall be given for any such a refusal.
2
Member States may take the measures necessary to ensure that the natural gas undertaking refusing access to the system on the basis of lack of capacity or a lack of connection makes the necessary enhancements as far as it is economic to do so or when a potential customer is willing to pay for them. In circumstances where Member States apply Article 4(4), Member States shall take such measures.